/* AUTO-GENERATED — DO NOT EDIT */
import type { SVGProps } from "react"

const DeviceThermostatFilled = (props: SVGProps<SVGSVGElement>) => (
  <svg viewBox="0 -960 960 960" {...props}>
    <path d="M480-80q-83 0-141.5-58.5T280-280q0-51 23-96t68-67v-328q0-45.42 31.79-77.21Q434.58-880 480-880q45.42 0 77.21 31.79Q589-816.42 589-771v328q45 22 68 67t23 96q0 83-58.5 141.5T480-80Zm-49-435h98v-53h-49v-39h49v-87h-49v-38.5h49V-771q0-20.83-14.12-34.91-14.13-14.09-35-14.09Q459-820 445-805.91q-14 14.08-14 34.91v256Z" />
  </svg>
)

export default DeviceThermostatFilled
