-- Update paint primer sizes to actual sizes.
UPDATE paint_primer_sizes SET liters = 2.7 WHERE liters = 5;
UPDATE paint_primer_sizes SET liters = 0.9 WHERE liters = 3;
UPDATE paint_primer_sizes SET liters = 0.5 WHERE liters = 1;
